```js
{
  stack: 'Error: Your button is not working\n' +
    '    at Object.<anonymous> ($SNIP/test.js:39:27)\n' +
    '    at Module._compile (node:internal/modules/cjs/loader:1103:14)\n' +
    '    at Object.Module._extensions..js (node:internal/modules/cjs/loader:1157:10)\n' +
    '    at Module.load (node:internal/modules/cjs/loader:981:32)\n' +
    '    at Function.Module._load (node:internal/modules/cjs/loader:822:12)\n' +
    '    at Function.executeUserEntryPoint [as runMain] (node:internal/modules/run_main:77:12)\n' +
    '    at node:internal/main/run_main_module:17:47',
  message: 'Your button is not working'
}
```